Title: The Fundamental Theorem of Calculus, Part 1 Post-Video Questions
Course: Calculus Videos Project > Section: The Fundamental Theorem of Calculus, Part 1

Q: The value of the definite integral is:
- 2
- 4
- 6
- 8
- 10
A: 4

Q: Let represent the rate at which water drains from a tank (in gallons per hour) and \(t\) represent the number of hours elapsed since water started draining from the tank. Which of the following best describes the meaning of
- The change in the rate at which the water drains from 1 to 4 hours after starting to drain the water.
- The change in the volume of water in the tank from 1 to 4 hours after starting to drain the tank.
- The average rate at which water is leaving the tank from 1 to 4 hours after starting to drain the tank.
- The amount of water that has drained from the tank 4 hours after starting to drain the tank
A: The change in the volume of water in the tank from 1 to 4 hours after starting to drain the tank.