Title: Optimization Introduction PostVideo Questions
Course: Calculus Videos Project Modules

Q: A function [Image: equation] is defined for x-values between 0 and 8. The graph below shows a graph of the derivative of [Image: equation].
[Image: image]
Which point corresponds to a global mimum of [Image: equation]?
- A (Incorrect)
- B (Incorrect)
- C (Incorrect)
- D (Correct)
- E (Incorrect)
- None of these points (Incorrect)
- you can't tell without more information (Incorrect)
A: D

Q: A function [Image: equation] is defined for x-values between 0 and 8. The graph below shows a graph of the derivative of [Image: equation].
[Image: image]
Point E Corresponds to a
- local mimimum of [Image: equation] (Incorrect)
- local maximum of [Image: equation] (Correct)
- neither a local max or a min of [Image: equation] (Incorrect)
- you can't tell without more information (Incorrect)
A: local maximum of [Image: equation]

Q: A function [Image: equation] is defined for x-values between 0 and 8. The graph below shows a graph of the derivative of [Image: equation].
[Image: image]
Point D Corresponds to a
- local mimimum of [Image: equation] (Correct)
- local maximum of [Image: equation] (Incorrect)
- neither a local max or a min of [Image: equation] (Incorrect)
- you can't tell without more information (Incorrect)
A: local mimimum of [Image: equation]

Q: A function [Image: equation] is defined for x-values between 0 and 8. The graph below shows a graph of the derivative of [Image: equation].
[Image: image]
Point C Corresponds to a
- local mimimum of [Image: equation] (Incorrect)
- local maximum of [Image: equation] (Incorrect)
- neither a local max or a min of [Image: equation] (Correct)
- you can't tell without more information (Incorrect)
A: neither a local max or a min of [Image: equation]

Q: A function [Image: equation] is defined for x-values between 0 and 8. The graph below shows a graph of the derivative of [Image: equation].
[Image: image]
Point B Corresponds to a
- local mimimum of [Image: equation] (Incorrect)
- local maximum of [Image: equation] (Correct)
- neither a local max or a min of [Image: equation] (Incorrect)
- you can't tell without more information (Incorrect)
A: local maximum of [Image: equation]

Q: A function [Image: equation] is defined for x-values between 0 and 8. The graph below shows a graph of the derivative of [Image: equation].
[Image: image]
Point A Corresponds to a
- local mimimum of [Image: equation] (Correct)
- local maximum of [Image: equation] (Incorrect)
- neither a local max or a min of [Image: equation] (Incorrect)
- you can't tell without more information (Incorrect)
A: local mimimum of [Image: equation]